Automated Software Engineering — ASE’99

14th IEEE International Conference October 12-15, 1999, Cocoa Beach Hilton, Cocoa Beach, Florida, USA

Abstracts due: May 1, 1999; Papers due: May 10, 1999

Latest information: http://sigart.acm.org/Conferences/ase/

General Chair Dorothy Setliff

University of Pittsburgh Program Co-Chairs Robert J. Hall

AT&T Labs Research

Enn Tyugu

Kungliga Tekniska Hoegskolan Publicity Co-Chairs John Penix

NASA Ames Research Center

Pierre Flener

Uppsala University Demonstrations Chair Jeffrey van Baalen

University of Wyoming Tutorials Chair Scott Henninger

University of Nebraska Doctoral Symposium Chair Perry Alexander

University of Cincinnati Program Committee Perry Alexander, USA Daniel Berry, Israel Leopoldo Bertossi, Chile Ted Biggerstaff, USA Alex Borgida, USA Shing-Chi Cheung, China Steve Easterbrook, USA Wolfgang Emmerich, UK Martin Feather, USA Steve Fickas, USA Bernd Fischer, USA Pierre Flener, Sweden Alfonso Fuggetta, Italy Gerry Gannod, USA Michael Goedicke, Germany Joseph Goguen, USA Cordell Green, USA Ian Green, UK John Grundy, New Zealand Yuri Gurevich, USA Robert Hall, USA Mehdi Harandi, USA Scott Henninger, USA Stan Jarzabek, Singapore Lewis Johnson, USA Bernd Kraemer, Germany Yves Ledru, France Julio Leite, Brazil Mike Lowry, USA Neil Maiden, UK Mihhail Matskin, Norway Ali Mili, USA Renaud Marlet, France John Mylopolous, Canada Bashar Nuseibeh, UK John Penix, USA Klaus Pohl, Germany Alex Quilici, USA David Redmiles, USA Debra Richardson, USA David Rosenblum, USA Akiyoshi Sato, Japan Dorothy Setliff, Australia Frank Shipman, USA Doug Smith, USA Tanel Tammet, Sweden Loren Terveen, USA Enn Tyugu, Sweden Jeff van Baalen, USA Richard Waldinger, USA Chris Welty, USA Doug White, USA David Wile, USA

Call for Papers

The IEEE International Conference on Automated Software Engineering brings together researchers and practitioners to share ideas on the foundations, techniques, tools and applications of automated software engineering technology. Both automatic systems and systems that support and cooperate with people are within the scope of the conference, as are models of software and software engineering activities. ASE-99 encourages contributions describing basic research, novel applications, and experience relevant to automating software engineering activities. Solicited topics include, but are not limited to,

ffl Automated design and synthesis

ffl Automated specification and analysis

ffl Category-theoretic approaches

ffl Computer-supported cooperative work

ffl Domain modeling

ffl Knowledge acquisition

ffl Maintenance and evolution

ffl Process and workflow management ffl Requirements engineering

ffl Reuse

ffl Reverse engineering, program understanding

ffl Software Architectures

ffl Testing

ffl Tutoring, Help, Documentation Systems

ffl User interfaces, human-computer interaction

ffl Verification and validation

The IEEE International Conference on Automated Software Engineering provides a forum for researchers and practitioners to discuss the foundations, techniques, tools and applications of automated software engineering technology. The conference encourages participation from researchers in related fields such as formal methods, partial evaluation, process support, human-computer interface support, requirements engineering, reverse engineering, testing, or verification & validation.

All accepted papers will be published in the proceedings. In addition, several of the highest quality papers will be selected for a special issue of The Journal of Automated Software Engineering (Kluwer). ASE-99 will also include invited talks, tutorials, panel discussions, and project demonstrations for which separate calls for participation will be issued. Following on the success of previous years, ASE-99 will again feature a doctoral consortium for selected thesis students whose work has not yet reached a publishable stage (see conference web page for details).

Submission Information: Papers should not exceed 6000 words in length, with full page figures counting as 300 words. Papers will be reviewed by at least three members of the program committee according to: technical quality, originality, clarity, appropriateness to the conference focus, and adequacy of references to related work. Papers that exceed the length restriction will not be reviewed. All submissions, especially application papers and experience reports, should clearly identify their novel contributions.

Please send six (6) copies of the paper to the address below.

Robert J. Hall, ASE’99 AT&T Labs Research 180 Park Ave, Bldg 103 Florham Park, NJ 07932

No fax or electronic submissions will be accepted. A paper’s title, authors, and abstract must be submitted by May 1, 1999 through electronic mail to ase99@research.att.com. Be sure to include the contact author’s working email address, as all subsequent communications will take place via email. Submission deadline for papers is May 10, 1999.